From 5288cfbed34f94c4321b8d9dc497cfd0da3ffd26 Mon Sep 17 00:00:00 2001
From: Ariel Costas Guerrero <ariel@costas.dev>
Date: Sun, 8 Mar 2026 23:42:39 +0100
Subject: Refactor VigoUsageProcessor to remove CSV whitelist loading; add
 StopUsageChart component for usage visualization in Stops page

---
 src/frontend/app/components/arrivals/ArrivalList.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/frontend/app/components/arrivals/ArrivalList.tsx')

diff --git a/src/frontend/app/components/arrivals/ArrivalList.tsx b/src/frontend/app/components/arrivals/ArrivalList.tsx
index ea01695..83eb4f0 100644
--- a/src/frontend/app/components/arrivals/ArrivalList.tsx
+++ b/src/frontend/app/components/arrivals/ArrivalList.tsx
@@ -17,7 +17,7 @@ export const ArrivalList: React.FC<ArrivalListProps> = ({
   const clickable = Boolean(onArrivalClick);
 
   return (
-    <div className="flex flex-col gap-3">
+    <div className="flex flex-col flex-1 gap-3">
       {arrivals.length === 0 && (
         <div className="text-center text-muted mt-16">
           {/* TOOD i18n */}
-- 
cgit v1.3

