From 5288cfbed34f94c4321b8d9dc497cfd0da3ffd26 Mon Sep 17 00:00:00 2001
From: Ariel Costas Guerrero <ariel@costas.dev>
Date: Sun, 8 Mar 2026 23:42:39 +0100
Subject: Refactor VigoUsageProcessor to remove CSV whitelist loading; add
 StopUsageChart component for usage visualization in Stops page

---
 src/frontend/app/components/layout/Header.tsx | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'src/frontend/app/components/layout/Header.tsx')

diff --git a/src/frontend/app/components/layout/Header.tsx b/src/frontend/app/components/layout/Header.tsx
index 4378e59..058c18c 100644
--- a/src/frontend/app/components/layout/Header.tsx
+++ b/src/frontend/app/components/layout/Header.tsx
@@ -14,7 +14,7 @@ export const Header: React.FC<HeaderProps> = ({
   onMenuClick,
   className = "",
 }) => {
-  const { onBack, backTo, titleNode } = usePageTitleContext();
+  const { onBack, backTo, titleNode, rightNode } = usePageTitleContext();
 
   return (
     <header className={`app-header ${className}`}>
@@ -41,7 +41,8 @@ export const Header: React.FC<HeaderProps> = ({
         )}
         {titleNode ? titleNode : <h1 className="app-header__title">{title}</h1>}
       </div>
-      <div className="app-header__right">
+      <div className="app-header__right flex items-center gap-2">
+        {rightNode}
         <button
           className="app-header__menu-btn"
           onClick={onMenuClick}
-- 
cgit v1.3

