From d05f5ffb04c8ef553e637fcd9d98477305b2014a Mon Sep 17 00:00:00 2001
From: Ariel Costas Guerrero <ariel@costas.dev>
Date: Mon, 1 Dec 2025 23:29:08 +0100
Subject: fix: increase auto-refresh interval from 12s to 18s

---
 src/frontend/app/routes/stops-$id.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'src/frontend/app/routes/stops-$id.tsx')

diff --git a/src/frontend/app/routes/stops-$id.tsx b/src/frontend/app/routes/stops-$id.tsx
index 32152f9..c674e22 100644
--- a/src/frontend/app/routes/stops-$id.tsx
+++ b/src/frontend/app/routes/stops-$id.tsx
@@ -162,7 +162,7 @@ export default function Estimates() {
 
   useAutoRefresh({
     onRefresh: refreshData,
-    interval: 12000,
+    interval: 18000,
     enabled: !dataError,
   });
 
-- 
cgit v1.3

